155Mbs

45Mbs

ICSI

Sprint / Global One

Teleglobe

Global Network Structure

Reston,Va

Montreal

Hamburg

Bonn

Deutsche Telekom

Mannheim

ICSI, Berkeley

Oakland

Sprint, Burlingame

Pacific Bell